-400 -200 0 200 -80 -60 -40 -20 0 20 40 60 80

Zonal mean Q_{Net} , Wm^{- 2}

Latitude

Fig. 11e)

-0.1 0 0.1 0.2 -80 -60 -40 -20 0 20 40 60 80

Zonal mean τ_x , Nm^{- 2}

Fig. 11f)

-0.1 0 0.1 0.2 -80 -60 -40 -20 0 20 40 60 80

Zonal mean τ_y , Nm^{- 2}

Fig. 11g)

0 0.05 0.1 0.15 0.2 -80 -60 -40 -20 0 20 40 60 80

Zonal mean τ, Nm^{- 2}

Fig. 11h)